)c (GeV/ p 0.5 1.0 1.5 2.0

(proton hypothesis) TPC σn

4-

2-

0

2

4

310

410

510

610 ALICE = 5.02 TeV NNs p-Pb, p

e π

)c (GeV/ p 1 2 3 4 5

(proton hypothesis) TOF σn

4-

2-

0

2

4

310

410

510 p

K